From 433b40e6fee7db4f3ff675ce5361c02a8f24ac49 Mon Sep 17 00:00:00 2001
From: Patrick Vacek <patrickvacek@gmail.com>
Date: Fri, 16 Nov 2018 17:35:39 +0100
Subject: docs: better explanation of oe-selftest requirements.

Also remove all references to aktualizr-example-interface. It has been removed.

Signed-off-by: Patrick Vacek <patrickvacek@gmail.com>
---
 README.adoc | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 6424a28..bed0591 100644
--- a/README.adoc
+++ b/README.adoc
@@ -146,7 +146,6 @@ First, you can set `SOTA_CLIENT_PROV` to control which provisioning recipe is us
 
 Second, you can write recipes to install additional config files with customized options. A few recipes already exist to address common needs and provide an example:
 
-* link:recipes-sota/config/aktualizr-example-interface.bb[aktualizr-example-interface.bb] will configure aktualizr to connect to an example interface for a legacy flasher. This is intended to be used in conjunction with the `aktualizr-examples` package. See https://github.com/advancedtelematic/aktualizr/blob/master/docs/legacysecondary.adoc[legacysecondary.adoc] in the aktualizr repo for more information.
 * link:recipes-sota/config/aktualizr-disable-send-ip.bb[aktualizr-disable-send-ip.bb] disables the reporting of networking information to the server. This is enabled by default and supported by https://connect.ota.here.com/[HERE OTA Connect]. However, if you are using a different server that does not support this feature, you may want to disable it in aktualizr.
 * link:recipes-sota/config/aktualizr-log-debug.bb[aktualizr-log-debug.bb] sets the log level of aktualizr to 0 (trace). The default is 2 (info). This recipe is intended for development and debugging purposes.
 
@@ -181,7 +180,7 @@ Please note that [target name, target version] pairs are expected to be unique i
 
 == QA with oe-selftest
 
-This layer relies on the test framework oe-selftest for quality assurance. Follow the steps below to run the tests:
+This layer relies on the test framework oe-selftest for quality assurance. Currently, you will need to run this in a build directory with `MACHINE` set to `qemux86-64`. Follow the steps below to run the tests:
 
 1. Append the line below to `conf/local.conf` to disable the warning about supported operating systems:
 +
-- 
cgit v1.2.3-54-g00ecf

